0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 2 -t GeV 1−

0.5 −

0

0.5

Σ

= 2.5 GeV (Preliminary) γ CLAS, E = 2.8 GeV γ SLAC, E = 2.25 GeV γ DESY, E