0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 )/GeV

-π ^+π

Mass( 0 2 4 6 8 10 12 14 16 18 20 22 24

Counts

Breit Wigner Constant Kept

Center = 0.790 +/- 0.008 GeV = 0.106 +/- 0.019 GeV Γ Preliminary